14.0 13.0 12.0 11.0 ppm

0 mM KCl

200 mM KCl

200 mM KCl 5 mM Mg^{2+}

A

B

C A B C DE F1,2 G H1-3 I1,2 JK L M O Q R S

A B C DE F1,2 G H1-3 I K L MN1,2O Q R J S P

A B C DE F1,2 G H1-3 I JK L M O QR S

N1,2

N1,2

Figure 1.3.1: The imino region of the proton spectrum of R1.1[LSΔ6] RNA at 5°C. A, 0 mM KCl. B, 200 mM KCl. C, 200 mM KCl and 5 mM MgCl2.

1.3 Results 13