0.0 20.0 40.0 60.0 80.0 100.0

T (C)

0.000

0.005

0.010

0.015

0.000

0.005

0.010

0.015

dA/dT (OD/C)

0.000

0.005

0.010

0.015

. .

0 mM KCl

200 mM KCl

200 mM KCl

5 mM Mg+2

A

B

C

Figure 1.3.4:. Absorbance at 260 nm of R1.1[LSΔ6] RNA (approximately 2.5 mM) as a function of temperature, differentiated with respect to temperature in order to highlight melting transitions. A, 0 mM KCl. B, 200 mM KCl. C, 200 mM KCl and 5 mM MgCl2.

1.3 Results 19