Figure 2.3.2: Non-denaturing gel electrophoresis of ITALY2 and METAL2. Lane 1, MRL1, a 24-nt duplex. Lanes 2-5, ITALY1 and METAL1, 17-nt stem-loops. Lanes 6-9, ITALY2 and METAL2. Lane 10, ABISS1, a 30-nt stem-loop.

MRL1

ITALY1 0.25x

0.5x

METAL1 0.25x

0.5x

ITALY2 0.25x

0.5x

METAL2 0.25x

0.5x

ABISS1

2.3 Results 78