0.0 20.0 40.0 60.0 80.0 100.0

0.000

0.005

0.010

0.015

0.3 OD 1.0 OD 3.0 OD 10.0 OD

0.0 20.0 40.0 60.0 80.0 100.0

0.000

0.005

0.010

0.015

0.3 OD 1.0 OD 3.0 OD 10.0 OD

Figure 2.3.3: UV melting profiles of ITALY2 and METAL2. 0.1 OD melts are not shown, since their signal-to-noise is very low.

ITALY2

METAL2 dA260/ d T dA260/ d T

T (°C)

2.3 Results 79