Figure 2.3.12: Superposition of the loop of ITALY2 (black) on the anticodon loop of tRNAPhe (gray). A, view showing the close superposition of C32, U33, A37 and A37 on their equivalents in the tRNAPhe loop. B, view showing the tilt of the nucleotides in ITALY2’s ’anticodon’ (34-36) relative to those in the anticodon of tRNAPhe.

A

B

2.3 Results 110