-1.4 -2.1 -2.8 -3.5 -4.2 -4.9 ppm

-1.4 -2.1 -2.8 -3.5 -4.2 -4.9 ppm Figure 2.3.18: One-dimensional proton-decoupled phosphorus spectra of ITALY2 and METAL2 at 5, 15 and 30°C.

A: ITALY2

B: METAL2

30°C

15°C

5°C

30°C

15°C

5°C

2.3 Results 121